SW

C1

10 m F

L1

6.8 m H

R1

R2

VBA T

VOUT

R5

C2

2.2 mF

C3

47 mF

LBO

PGND

LBI

PS

EN

GND

TPS61027

List of Components:

U1 = TPS61027DRC1

L1 = EPCOS B82462-G4682

C3, C5, C6, = X7R,X5R Ceramic

C3 = Low ESR Tantalum

DS1 = BAT54S

LBO

C5

0.1 m F

DS1

C6

1 mF

V C C 2

10 V

Unregulated

Auxiliary Output

Battery

Input

FB

V C C 1 5 V

Boost Main Output